-- hh
-- 幻光副本增加昨日最高波记录

ALTER TABLE `role_dun_visus`
    ADD COLUMN `last_highest_wave` varchar(100) NOT NULL DEFAULT '[]' COMMENT '昨天最高波数' AFTER `time`;