-- liushl
CREATE TABLE `merge_server_local` (
  `server_id` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '服务器Id',
  PRIMARY KEY (`server_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COMMENT='本服合服信息(合服合并保留)';

CREATE TABLE `merge_server_center` (
  `server_id` int(11) unsigned NOT NULL DEFAULT '0' COMMENT '服务器Id',
  PRIMARY KEY (`server_id`)
) ENGINE=InnoDB DEFAULT CHARSET=utf8 COMMENT='跨服合服信息(合服合并保留)';
